ALTER TABLE `dataset_entry` ADD `rms_value` real;--> statement-breakpoint
ALTER TABLE `dataset_entry` ADD `longest_pause` real;--> statement-breakpoint
ALTER TABLE `dataset_entry` ADD `utmos_score` real;--> statement-breakpoint
ALTER TABLE `dataset_entry` ADD `wer_score` real;